en	Status Report

en	Get a status report about your site's operation and any detected problems.

en	Here you can find a short overview of your site's parameters as well as any problems detected with your installation. It may be useful to copy and paste this information into support requests filed on TYPO3's support mailinglists and project issue trackers.

en	OK

en	Wrong value detected

en	Information

en	Insecure

en	Disabled

en	Enabled

en	Enabled permanently

en	Enabled temporarily

en	Empty

en	None

en	Connection Failed

en	Check Failed

en	Update Complete

en	Update Incomplete

en	One or more problems were detected with your TYPO3 installation. Please check the %sstatus report%s for more information.

en	This report contains all System Status Notifications from your TYPO3 installation. Please check the %sstatus report%s for more information.

en	TYPO3 System

en	System

en	Security

en	Configuration

en	Reference Index

en	File Abstraction Layer

en	Files flagged as missing

en	%1$s files

en	These files are flagged as missing. Restore the files and run the indexer to reset the missing flag.

en	Memcached Configuration

en	PHP safe_mode

en	PHP magic_quotes_gpc

en	Permissions of created files

en	Files created by TYPO3 are configured to be world writable. Depending on your server configuration, this can be a security risk. It is usually better to configure the create mask to not allow writing to files by "others". A sane default is often '0660' for $GLOBALS['TYPO3_CONF_VARS']['SYS']['fileCreateMask']. This can be set in the install tool.

en	Permissions of created directories

en	Directories created by TYPO3 are configured to be world writable. Depending on your server configuration, this can be a security risk. It is usually better to configure the create mask to not allow writing to directories by "others". A sane default is often '2770' for $GLOBALS['TYPO3_CONF_VARS']['SYS']['folderCreateMask']. This can be set in the install tool.

en	MySQL Database Character Set

en	Checking database character set failed, got key "%1$s" instead of "character_set_database"

en	Your default database uses character set "%1$s", but only "utf8", "utf8mb3" or "utf8mb4" is supported with TYPO3.

en	Your default database uses utf-8. All good.

en	Your default database uses a different charset, but all tables uses utf-8. All good. But consider fixing your database collation and check the table creation settings.

en	Your default database is set to create tables with character set "%1$s", but contains tables or columns with different collations. Please fix these tables to avoid "illegal mix of collations" errors.

en	Encrypted backend connection (HTTPS)

en	Your backend access is not secured using HTTPS but relies on HTTP which sends all your data (including login passwords) over an insecure connection. All modern web sites should rely on HTTPS and only sites secured differently, for instance some intranet installations may use HTTP only.

en	Backend only accessible through HTTPS

en	It is highly recommended to activate the option (<code>$GLOBALS['TYPO3_CONF_VARS']['BE']['lockSSL']</code>).

en	Trusted Hosts Pattern

en	Admin User Account

en	Encryption Key

en	File Deny Pattern

en	.htaccess Upload Protection

en	Exception Handler / Error Reporting

en	XML/T3D export files

en	Display Errors is set to 1 - errors will be displayed with the DebugExceptionHandler including stack traces.

en	Debug Exception Handler enabled in Production Context - will show full error messages including stack traces.

en	The following exported files were found:

en	It is recommended to delete exported files to avoid possible disclosure of exported data to backend users with lower/different access rights than user(s) who originally created the export(s).

en	Install Tool

en	PHP Version

en	Your PHP installation is too old.

en	PHP Memory Limit

en	Depending on your configuration, TYPO3 can run with a %1$s PHP memory limit. However, a %2$s PHP memory limit or above is recommended, especially if your site uses additional extensions.

en	Depending on your configuration, TYPO3 can run with a %1$s PHP memory limit. However, a %2$s PHP memory limit or above is required especially if your site uses additional extensions.

en	Increase the memory limit by editing the memory_limit parameter in the file %s and then restart your web server (or contact your system administrator or hosting provider for assistance).

en	Contact your system administrator or hosting provider for assistance with increasing your PHP memory limit.

en	unlimited

en	PHP peak memory usage

en	During a request %2$s of the memory limit was used. On %4$s a request to %5$s used %1$s of %3$s.

en	Clear this flag

en	PHP Register Globals

en	%s is enabled. TYPO3 requires this configuration directive to be disabled.

en	Your site may not be secure when %s is enabled.

en	how to change configuration settings

en	The PHP manual has instructions for %s.

en	Web Server

en	For your Web Server some notifications have been found

en	Fluid uses complex regular expressions which require a lot of stack space during the first processing. On Windows the default stack size for Apache is a lot smaller than on unix. You can increase the size to 8MB (default on unix) by adding to the httpd.conf: <br />&lt;IfModule mpm_winnt_module&gt; <br />ThreadStackSize 8388608 <br />&lt;/IfModule&gt; <br />Restart Apache after this change.

en	PHP Modules

en	One or more modules are missing.

en	The following PHP module(s) is/are missing: %s.

en	You need to install and enable these modules to let TYPO3 function correctly.

en	one of: %s

en	All required modules are installed.

en	The Install Tool is temporarily enabled. Delete the file "%s" when you have finished setting up TYPO3. If not used the Install Tool will be disabled automatically in %s minutes.

en	PHP INI setting safe_mode "On" is deprecated since PHP 5.3 and is not supported by TYPO3 anymore.

en	PHP INI setting magic_quotes_gpc "On" is deprecated since PHP 5.3. You are advised to set it to "Off" until it gets completely removed.

en	System Status Update

en	Runs a system status check and sends notifications if problems have been found.

en	Notification Email Address

en	Notification Email Addresses (one per line)

en	Empty or invalid notification email address.

en	Empty or invalid notification email addresses.

en	Always send notification mail (not only on errors or warnings)

en	System Status Notification for site %s

en	Site

en	Issues

en	XCLASS used

en	Your system registers XCLASS

en	XCLASS can overwrite methods or classes of the core or other extensions. This is not necessarily a bad thing, but those XCLASS might break during extension or core upgrades. You should keep an eye on extension compatibility and make sure the intended functionality is still given after updates.

en	%2$s registers an XCLASS of %1$s