en	You must fill out both password fields

en	The passwords do not match

en	This password appeared in a data breach and is found %1s times in the haveibeenpwned.com database. Please choose a different password.

en	This password can not be used, because it equals the old password.

en	The password has been updated

en	Password updated

en	Change password code

en	Send change password code

en	Current Password

en	Password

en	Repeat Password

en	Update

en	Please check your input for the following errors:

en	You must change your password

en	Your password has expired and must be changed

en	You need to be logged in to update your password

en	Please enter your current password in the corresponding field.

en	The current password you entered is wrong.

en	You must enter the change password code.

en	The given change password code is invalid or has expired.

en	The change password code has been sent to your email address.

en	Change password code sent

en	Change password code could not be sent, because no valid email address is configured for your acccount.

en	Invalid email address

en	Your change password code

en	Change password code

en	Please find below the change password code you requested.

en	Code

en	Valid until

en	The change password code can be used multiple times either until the validity date is reached or until the password has been successfully changed.