en	User

en	Username

en	Password

en	Repeat Password

en	Usergroup

en	Full Name

en	Firstname

en	Middlename

en	Lastname

en	Birthdate

en	Please type your birthdate as MM/DD/YYYY

en	MM/DD/YYYY

en	m/d/Y

en	Gender

en	Male

en	Female

en	Diverse

en	Address

en	Telephone

en	Fax

en	Email

en	Title

en	ZIP

en	City

en	Country

en	State

en	Website

en	Company

en	Image

en	Captcha

en	I accept the terms and conditions

en	Click here for terms and conditions

en	Last login

en	Inactive since

en	Creation Time

en	User Log

en	Title

en	Time

en	State

en	Registration

en	New Registration

en	Registration confirmed by user

en	Registration confirmed by admin

en	Registration refused by user

en	Registration refused by admin

en	Profile creation request

en	Update

en	Profile updated

en	Profile update confirmed by admin

en	Profile update refused by admin

en	Profile update request

en	Profile update security failure

en	Image deleted

en	Attempted to spoof profile

en	Delete

en	Profile deleted

en	Invitation

en	Profile created and user invited

en	Profile deleted by user

en	Wrong hash

en	You tried to open a restricted page

en	Password changed and profile activated

en	User

en	No TypoScript found. Did you already include the static Template?

en	No TypoScript found. Did you already setup module.tx_femanager.settings.configPID in your PageTS?

en	No Storage PID was set. Please set the storage PID via TypoScript or in the plugin settings.

en	You are not authorized for this action

en	Error

en	Username and password must be filled

en	Given date format is wrong

en	Field %s is required

en	Field %s is not a valid email address

en	Please add more characters to field %s

en	Please add less characters to field %s

en	Only numbers are allowed in field %s

en	Only letters are allowed in field %s

en	Value of field %s is already in use

en	Value of field %s is already in use

en	Try another value for field %s

en	Not allowed signs in field %s

en	This value is not allowed in field %s

en	Values do not match

en	Both passwords do not match

en	Date has the wrong format

en	Wrong Captcha code

en	Field could not be validated

en	Please confirm a new registration

en	Dear Admin,

en	User properties:

en	Please confirm registration of %s by clicking the following link:

en	Confirm registration

en	If you want to delete the registration, click this link:

en	Delete profile

en	If you want to delete the registration, without sending an email to the user, click this link:

en	Silently delete profile

en	Please confirm your profile creation request

en	Dear

en	Please confirm your profile registration on our server by clicking the following link:

en	Confirm profile

en	If you don't want to be registered on our system, click this link:

en	Delete profile

en	Your website team.

en	Your registration was confirmed

en	Dear

en	Your profile was confirmed and successfully created.

en	Your website team.

en	Dear

en	Dear

en	Thank you for your profile request. We're sorry to tell you, that we had to refuse your request.

en	Your website team.

en	New profile registration

en	Dear Admin,

en	Profile creation - User %s

en	Profile creation - User %s set a new password and profile was enabled

en	Profile properties:

en	Profile update

en	Dear Admin,

en	Profile change by user %s

en	Fieldname

en	Old value

en	New value

en	New profile change request

en	Dear Admin,

en	Profile change request from %s

en	All changes:

en	Fieldname

en	Old value

en	New value

en	Confirm changes

en	Refuse changes and notify user

en	Refuse changes and do not notify user

en	Your update request was refused

en	Dear

en	Thank you for your update request. We're sorry to tell you, that we had to refuse your request.

en	Please contact %s for further information.

en	Your website team.

en	Confirm your profile

en	Dear

en	Your new profile was just created.

en	Please confirm your profile registration on our server by clicking the following link. After that, you can define a password.

en	Confirm Profile

en	If you don't want to be registered on our system, click this link.

en	Delete Profile

en	Your website team.

en	User was invited

en	User invitation - Profile finally created

en	User refused invitation

en	Dear Admin,

en	Profile invitation of %s

en	Profile invitation - User %s refused to set a new password. The profile was deleted.

en	Profile properties:

en	Please confirm your choice

en	By clicking this submit button, the registration of %s will be confirmed:

en	Confirm registration

en	By clicking this button, you confirm to delete the registration:

en	Delete registration

en	By clicking this button, you confirm to delete the registration, without sending an email to the user:

en	Silently delete registration

en	By clicking this submit button, your registration will be confirmed:

en	Confirm registration

en	To confirm that you don't want to be registered on our system and having your information removed, click this button:

en	Delete registration

en	By clicking this submit button you confirm your profile. After that, you can define a password:

en	Confirm Registration

en	To confirm that you don't want to be registered on our system and having your information removed, click this button:

en	Delete Registration

en	No records found.

en	Clean filter.

en	Show all users from all pages (for administrators only).

en	No FE_User given or not logged in

en	Please log in before

en	Create Profile Now

en	Resend now

en	Repeat Password

en	Create a new user-profile

en	Resend confirmation mail

en	Please enter your email address

en	Update Profile

en	Profile successfully created

en	Profile successfully created and user informed

en	Profile successfully changed and enabled

en	Thank you for your request. Please check your mail account to confirm the profile.

en	Thank you for your registration. Your profile will be available as soon as the admin confirms your request.

en	An Email was send to your account. Please check your inbox.

en	We received no valid mail.

en	Too many attempts from this IP address. Try again later.

en	Profile creation failed

en	Profile is already confirmed

en	No Profile found in database. Maybe it was deleted before.

en	Profile successfully deleted

en	Update your user-profile

en	Please confirm the deletion of your account.

en	Profile successfully changed

en	No changes detected, nothing to update

en	Your change request was transmitted to the administrator. After a confirmation, your profile will be up-to-date.

en	You're successfully logged in now

en	Delete Profile

en	Profile successfully updated

en	Profile update failed

en	Please enable fineUploader plugin

en	Drag file

en	Drag in progress ...

en	Upload

en	empty

en	Please choose ...

en	Please choose a country ...

en	Search

en	Search ...

en	Filter now

en	Are you sure to delete your profile?

en	Invite a new user

en	Please set a new password

en	Delete

en	Are you sure to delete this User?

en	Edit

en	Logout

en	Offline

en	Online

en	Disable

en	Hidden

en	Enable

en	Search

en	Login as

en	Possible action:

en	%s approval(s) available

en	%s user(s) need to be confirmed by admin

en	Actions

en	The config PID is missing!

en	UID

en	%s was successfully approved

en	The user confirmation failed, please check your system log or check your config

en	%s was refused

en	resend user confirmation e-mail

en	%s confirmation mail was resent

en	Your userprofile is not confirmed yet.

en	Resend confirmation email?

en	User registration

en	Loading states ...